From 50c8f9adb8b60929e800387459742c3caf7de443 Mon Sep 17 00:00:00 2001
From: Daniel Bevenius <daniel.bevenius@gmail.com>
Date: Thu, 6 Jan 2022 11:11:52 +0100
Subject: Fix typo in basic_application.adoc

---
 docs/modules/ROOT/pages/basic_application.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/modules/ROOT/pages/basic_application.adoc')

diff --git a/docs/modules/ROOT/pages/basic_application.adoc b/docs/modules/ROOT/pages/basic_application.adoc
index 46a375c86..749869ec0 100644
--- a/docs/modules/ROOT/pages/basic_application.adoc
+++ b/docs/modules/ROOT/pages/basic_application.adoc
@@ -35,7 +35,7 @@ include::example$basic/src/main.rs[lines="18..27"]
 
 An embassy task must be declared `async`, and may NOT take generic arguments. In this case, we are handed the LED that should be blinked and the interval of the blinking.
 
-NOTE: Notice that there is not busy waiting going on in this task. It is using the Embassy timer to yield execution, allowing the microcontroller to sleep in between the blinking.
+NOTE: Notice that there is no busy waiting going on in this task. It is using the Embassy timer to yield execution, allowing the microcontroller to sleep in between the blinking.
 
 === Main
 
-- 
cgit 

