From 4c0d63ce6188a340bd75388c3e772ba5d89ca8d4 Mon Sep 17 00:00:00 2001
From: Andreas Schmidt <ndrscodes@gmail.com>
Date: Fri, 1 Mar 2024 10:13:59 +0100
Subject: docs: update broken reference in basic_application.adoc

---
 docs/modules/ROOT/pages/basic_application.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/modules/ROOT/pages/basic_application.adoc')

diff --git a/docs/modules/ROOT/pages/basic_application.adoc b/docs/modules/ROOT/pages/basic_application.adoc
index 02b8981c9..d5aad806d 100644
--- a/docs/modules/ROOT/pages/basic_application.adoc
+++ b/docs/modules/ROOT/pages/basic_application.adoc
@@ -23,7 +23,7 @@ Then, what follows are some declarations on how to deal with panics and faults.
 
 [source,rust]
 ----
-include::example$basic/src/main.rs[lines="10"]
+include::example$basic/src/main.rs[lines="8"]
 ----
 
 === Task declaration
-- 
cgit 

