From d07a0148d759fa09ba1ee8dc4810bb4edd8bda49 Mon Sep 17 00:00:00 2001
From: Barnaby Walters <barnaby@waterpigs.co.uk>
Date: Wed, 28 Feb 2024 15:48:37 +0100
Subject: Documented rp2040 probe-rs info bug, linked to new_project page

---
 docs/modules/ROOT/pages/getting_started.adoc | 3 +++
 1 file changed, 3 insertions(+)

(limited to 'docs/modules/ROOT/pages/getting_started.adoc')

diff --git a/docs/modules/ROOT/pages/getting_started.adoc b/docs/modules/ROOT/pages/getting_started.adoc
index e8bc84255..73cb5530d 100644
--- a/docs/modules/ROOT/pages/getting_started.adoc
+++ b/docs/modules/ROOT/pages/getting_started.adoc
@@ -129,6 +129,8 @@ Make sure that you didn’t accidentally run `+cargo add probe-rs+` (which adds
 
 If you’re using a raspberry pi pico-w, make sure you’re running `+cargo run --bin wifi_blinky --release+` rather than the regular blinky. The pico-w’s on-board LED is connected to the WiFi chip, which needs to be initialized before the LED can be blinked.
 
+If you’re using an rp2040 debug probe (e.g. the pico probe) and are having issues after running `probe-rs info`, unplug and reconnect the probe, letting it power cycle. Running `probe-rs info` is link:https://github.com/probe-rs/probe-rs/issues/1849[known to put the pico probe into an unusable state].
+
 If you’re still having problems, check the link:https://embassy.dev/book/dev/faq.html[FAQ], or ask for help in the link:https://matrix.to/#/#embassy-rs:matrix.org[Embassy Chat Room].
 
 == What's next?
@@ -138,3 +140,4 @@ Congratulations, you have your first Embassy application running! Here are some
 * Read more about the xref:runtime.adoc[executor].
 * Read more about the xref:hal.adoc[HAL].
 * Start xref:basic_application.adoc[writing your application].
+* Learn how to xref:new_project.adoc[start a new embassy project by adapting an example].
-- 
cgit 

