From 0d19dcc8e5acb3ba64093bc4e7be279f4aabe2ae Mon Sep 17 00:00:00 2001
From: Ulf Lilleengen <ulf.lilleengen@gmail.com>
Date: Wed, 23 Feb 2022 13:24:09 +0100
Subject: Update after review

---
 docs/modules/ROOT/pages/layer_by_layer.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'docs/modules/ROOT/pages/layer_by_layer.adoc')

diff --git a/docs/modules/ROOT/pages/layer_by_layer.adoc b/docs/modules/ROOT/pages/layer_by_layer.adoc
index ed00b82cc..a96dd9fe2 100644
--- a/docs/modules/ROOT/pages/layer_by_layer.adoc
+++ b/docs/modules/ROOT/pages/layer_by_layer.adoc
@@ -77,9 +77,9 @@ The async version looks very similar to the HAL version, apart from a few minor
 * The peripheral initialization is done by the main macro, and is handed to the main task.
 * Before checking the button state, the application is awaiting a transition in the pin state (low -> high or high -> low).
 
-When `button.awit_for_any_edge().await` is called, the executor will pause the main task and put the microcontroller in sleep mode. Internally, the Embassy HAL has configured the interrupt handler for the button (in `ExtiButton`), so that whenever an interrupt is raised, the task awaiting the button will be woken up.
+When `button.await_for_any_edge().await` is called, the executor will pause the main task and put the microcontroller in sleep mode, unless there are other tasks that can run. Internally, the Embassy HAL has configured the interrupt handler for the button (in `ExtiButton`), so that whenever an interrupt is raised, the task awaiting the button will be woken up.
 
-The overhead of the executor is minimal, and combined with the enormous simplification of the application, `async` is a great fit for embedded.
+The minimal overhead of the executor and the ability to run multiple tasks "concurrently" combined with the enormous simplification of the application, makes `async` a great fit for embedded.
 
 == Summary
 
-- 
cgit 

