From a42aef7759a2f2b1da5bb9a62bb83006c4e856e0 Mon Sep 17 00:00:00 2001
From: AdinAck <adinackerman@gmail.com>
Date: Mon, 27 Nov 2023 10:51:05 -0800
Subject: it's -> its
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

Co-authored-by: Dániel Buga <bugadani@gmail.com>
---
 docs/modules/ROOT/pages/project_structure.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/modules/ROOT/pages/project_structure.adoc')

diff --git a/docs/modules/ROOT/pages/project_structure.adoc b/docs/modules/ROOT/pages/project_structure.adoc
index 31417d09c..ac992f8bd 100644
--- a/docs/modules/ROOT/pages/project_structure.adoc
+++ b/docs/modules/ROOT/pages/project_structure.adoc
@@ -1,6 +1,6 @@
 = Project Structure
 
-There are many ways to configure embassy and it's components for your exact application. The link:https://github.com/embassy-rs/embassy/tree/main/examples[examples] directory for each chipset demonstrate how your project structure should look. Let's break it down:
+There are many ways to configure embassy and its components for your exact application. The link:https://github.com/embassy-rs/embassy/tree/main/examples[examples] directory for each chipset demonstrates how your project structure should look. Let's break it down:
 
 The toplevel file structure of your project should look like this:
 [source,plain]
-- 
cgit 

